(kicad_pcb
	(version 20241229)
	(generator "pcbnew")
	(generator_version "9.0")
	(general
		(thickness 1.6)
		(legacy_teardrops no)
	)
	(paper "A4")
	(layers
		(0 "F.Cu" signal)
		(2 "B.Cu" signal)
		(9 "F.Adhes" user "F.Adhesive")
		(11 "B.Adhes" user "B.Adhesive")
		(13 "F.Paste" user)
		(15 "B.Paste" user)
		(5 "F.SilkS" user "F.Silkscreen")
		(7 "B.SilkS" user "B.Silkscreen")
		(1 "F.Mask" user)
		(3 "B.Mask" user)
		(17 "Dwgs.User" user "User.Drawings")
		(19 "Cmts.User" user "User.Comments")
		(21 "Eco1.User" user "User.Eco1")
		(23 "Eco2.User" user "User.Eco2")
		(25 "Edge.Cuts" user)
		(27 "Margin" user)
		(31 "F.CrtYd" user "F.Courtyard")
		(29 "B.CrtYd" user "B.Courtyard")
		(35 "F.Fab" user)
		(33 "B.Fab" user)
		(39 "User.1" user)
		(41 "User.2" user)
		(43 "User.3" user)
		(45 "User.4" user)
	)
	(setup
		(pad_to_mask_clearance 0)
		(allow_soldermask_bridges_in_footprints no)
		(tenting front back)
		(pcbplotparams
			(layerselection 0x00000000_00000000_55555555_5755f5ff)
			(plot_on_all_layers_selection 0x00000000_00000000_00000000_00000000)
			(disableapertmacros no)
			(usegerberextensions no)
			(usegerberattributes yes)
			(usegerberadvancedattributes yes)
			(creategerberjobfile yes)
			(dashed_line_dash_ratio 12.000000)
			(dashed_line_gap_ratio 3.000000)
			(svgprecision 4)
			(plotframeref no)
			(mode 1)
			(useauxorigin no)
			(hpglpennumber 1)
			(hpglpenspeed 20)
			(hpglpendiameter 15.000000)
			(pdf_front_fp_property_popups yes)
			(pdf_back_fp_property_popups yes)
			(pdf_metadata yes)
			(pdf_single_document no)
			(dxfpolygonmode yes)
			(dxfimperialunits yes)
			(dxfusepcbnewfont yes)
			(psnegative no)
			(psa4output no)
			(plot_black_and_white yes)
			(sketchpadsonfab no)
			(plotpadnumbers no)
			(hidednponfab no)
			(sketchdnponfab yes)
			(crossoutdnponfab yes)
			(subtractmaskfromsilk no)
			(outputformat 1)
			(mirror no)
			(drillshape 0)
			(scaleselection 1)
			(outputdirectory "/home/james/Desktop/rpzfc/")
		)
	)
	(net 0 "")
	(net 1 "GND")
	(net 2 "+5V")
	(net 3 "/GP1")
	(net 4 "/GP0")
	(net 5 "/GP3")
	(net 6 "/GP2")
	(net 7 "/GP4")
	(net 8 "/GP5")
	(net 9 "/GP7")
	(net 10 "/GP6")
	(net 11 "+3.3V")
	(net 12 "unconnected-(RZ1-GP15-Pad16)")
	(net 13 "unconnected-(RZ1-GP27-Pad18)")
	(net 14 "unconnected-(RZ1-GP9-Pad10)")
	(net 15 "unconnected-(RZ1-GP13-Pad14)")
	(net 16 "unconnected-(RZ1-GP11-Pad12)")
	(net 17 "unconnected-(RZ1-GP28-Pad19)")
	(net 18 "unconnected-(RZ1-GP12-Pad13)")
	(net 19 "unconnected-(RZ1-GP29-Pad20)")
	(net 20 "unconnected-(RZ1-GP14-Pad15)")
	(net 21 "unconnected-(RZ1-GP10-Pad11)")
	(net 22 "unconnected-(RZ1-GP8-Pad9)")
	(net 23 "unconnected-(RZ1-GP26-Pad17)")
	(net 24 "VCC")
	(footprint "MountingHole:MountingHole_2.7mm_M2.5"
		(layer "F.Cu")
		(at 136.2 39.4)
		(descr "Mounting Hole 2.7mm, M2.5, no annular, generated by kicad-footprint-generator mountinghole.py")
		(tags "mountinghole M2.5")
		(property "Reference" "REF**"
			(at 0 -3.65 0)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "MountingHole_2.7mm_M2.5"
			(at 0 3.65 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(attr exclude_from_pos_files exclude_from_bom)
		(pad "" np_thru_hole circle
			(at 0 0)
			(size 2.7 2.7)
			(drill 2.7)
			(layers "*.Cu" "*.Mask")
		)
		(embedded_fonts no)
	)
	(footprint "Connector_Molex:Molex_KK-254_AE-6410-04A_1x04_P2.54mm_Vertical"
		(layer "F.Cu")
		(at 160.5 85.5 -90)
		(descr "Molex KK-254 Interconnect System, old/engineering part number: AE-6410-04A example for new part number: 22-27-2041, 4 Pins (http://www.molex.com/pdm_docs/sd/022272021_sd.pdf), generated with kicad-footprint-generator")
		(tags "connector Molex KK-254 vertical")
		(property "Reference" "FAN3"
			(at -2.69 0 180)
			(layer "F.SilkS")
		)
		(property "Value" "Conn_01x04_Pin"
			(at 3.81 4.08 90)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "~"
			(at 0 0 90)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" "Generic connector, single row, 01x04, script generated"
			(at 0 0 90)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Connector*:*_1x??_*")
		(sheetname "/")
		(sheetfile "PCB.kicad_sch")
		(attr through_hole)
		(fp_text user "${REFERENCE}"
			(at 3.81 -2.22 90)
			(layer "F.Fab")
		)
		(pad "1" thru_hole roundrect
			(at 0 0 270)
			(size 1.74 2.19)
			(drill 1.19)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(roundrect_rratio 0.143678)
			(net 10 "/GP6")
			(pinfunction "Pin_1")
			(pintype "passive")
		)
		(pad "2" thru_hole oval
			(at 2.54 0 270)
			(size 1.74 2.19)
			(drill 1.19)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 9 "/GP7")
			(pinfunction "Pin_2")
			(pintype "passive")
		)
		(pad "3" thru_hole oval
			(at 5.08 0 270)
			(size 1.74 2.19)
			(drill 1.19)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 24 "VCC")
			(pinfunction "Pin_3")
			(pintype "passive")
		)
		(pad "4" thru_hole oval
			(at 7.62 0 270)
			(size 1.74 2.19)
			(drill 1.19)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "Pin_4")
			(pintype "passive")
		)
		(embedded_fonts no)
		(model "${KICAD9_3DMODEL_DIR}/Connector_Molex.3dshapes/Molex_KK-254_AE-6410-04A_1x04_P2.54mm_Vertical.step"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "MountingHole:MountingHole_2.7mm_M2.5"
		(layer "F.Cu")
		(at 136.2 98.4)
		(descr "Mounting Hole 2.7mm, M2.5, no annular, generated by kicad-footprint-generator mountinghole.py")
		(tags "mountinghole M2.5")
		(property "Reference" "REF**"
			(at 0 -3.65 0)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "MountingHole_2.7mm_M2.5"
			(at 0 3.65 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(attr exclude_from_pos_files exclude_from_bom)
		(pad "" np_thru_hole circle
			(at 0 0)
			(size 2.7 2.7)
			(drill 2.7)
			(layers "*.Cu" "*.Mask")
		)
		(embedded_fonts no)
	)
	(footprint "Connector_Molex:Molex_KK-254_AE-6410-04A_1x04_P2.54mm_Vertical"
		(layer "F.Cu")
		(at 152.5 85.5 -90)
		(descr "Molex KK-254 Interconnect System, old/engineering part number: AE-6410-04A example for new part number: 22-27-2041, 4 Pins (http://www.molex.com/pdm_docs/sd/022272021_sd.pdf), generated with kicad-footprint-generator")
		(tags "connector Molex KK-254 vertical")
		(property "Reference" "FAN2"
			(at -2.71 0 180)
			(layer "F.SilkS")
		)
		(property "Value" "Conn_01x04_Pin"
			(at 3.81 4.08 90)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "~"
			(at 0 0 90)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" "Generic connector, single row, 01x04, script generated"
			(at 0 0 90)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Connector*:*_1x??_*")
		(sheetname "/")
		(sheetfile "PCB.kicad_sch")
		(attr through_hole)
		(fp_text user "${REFERENCE}"
			(at 3.81 -2.22 90)
			(layer "F.Fab")
		)
		(pad "1" thru_hole roundrect
			(at 0 0 270)
			(size 1.74 2.19)
			(drill 1.19)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(roundrect_rratio 0.143678)
			(net 7 "/GP4")
			(pinfunction "Pin_1")
			(pintype "passive")
		)
		(pad "2" thru_hole oval
			(at 2.54 0 270)
			(size 1.74 2.19)
			(drill 1.19)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 8 "/GP5")
			(pinfunction "Pin_2")
			(pintype "passive")
		)
		(pad "3" thru_hole oval
			(at 5.08 0 270)
			(size 1.74 2.19)
			(drill 1.19)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 24 "VCC")
			(pinfunction "Pin_3")
			(pintype "passive")
		)
		(pad "4" thru_hole oval
			(at 7.62 0 270)
			(size 1.74 2.19)
			(drill 1.19)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "Pin_4")
			(pintype "passive")
		)
		(embedded_fonts no)
		(model "${KICAD9_3DMODEL_DIR}/Connector_Molex.3dshapes/Molex_KK-254_AE-6410-04A_1x04_P2.54mm_Vertical.step"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_THT:R_Axial_DIN0204_L3.6mm_D1.6mm_P1.90mm_Vertical"
		(layer "F.Cu")
		(at 153.75 74.75 180)
		(descr "Resistor, Axial_DIN0204 series, Axial, Vertical, pin pitch=1.9mm, 0.167W, length*diameter=3.6*1.6mm^2, http://cdn-reichelt.de/documents/datenblatt/B400/1_4W%23YAG.pdf")
		(tags "Resistor Axial_DIN0204 series Axial Vertical pin pitch 1.9mm 0.167W length 3.6mm diameter 1.6mm")
		(property "Reference" "R3"
			(at 0.95 -1.92 0)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "10kR"
			(at 0.95 1.92 0)
			(layer "F.Fab")
		)
		(property "Datasheet" "~"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" "Resistor"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "/")
		(sheetfile "PCB.kicad_sch")
		(attr through_hole)
		(pad "1" thru_hole circle
			(at 0 0 180)
			(size 1.4 1.4)
			(drill 0.7)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 11 "+3.3V")
			(pintype "passive")
		)
		(pad "2" thru_hole circle
			(at 1.9 0 180)
			(size 1.4 1.4)
			(drill 0.7)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 8 "/GP5")
			(pintype "passive")
		)
		(embedded_fonts no)
		(model "${KICAD9_3DMODEL_DIR}/Resistor_THT.3dshapes/R_Axial_DIN0204_L3.6mm_D1.6mm_P1.90mm_Vertical.step"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_THT:C_Disc_D3.0mm_W2.0mm_P2.50mm"
		(layer "F.Cu")
		(at 143.52 79.06)
		(descr "C, Disc series, Radial, pin pitch=2.50mm, diameter*width=3*2mm^2, Capacitor")
		(tags "C Disc series Radial pin pitch 2.50mm diameter 3mm width 2mm Capacitor")
		(property "Reference" "C2"
			(at 1.04 -2.25 0)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "100nF"
			(at 1.25 -2.06 0)
			(layer "F.Fab")
		)
		(property "Datasheet" "~"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" "Unpolarized capacitor"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "/")
		(sheetfile "PCB.kicad_sch")
		(attr through_hole)
		(fp_text user "${REFERENCE}"
			(at 1.25 0 0)
			(layer "F.Fab")
		)
		(pad "1" thru_hole circle
			(at 0 0)
			(size 1.6 1.6)
			(drill 0.8)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 24 "VCC")
			(pintype "passive")
		)
		(pad "2" thru_hole circle
			(at 2.5 0)
			(size 1.6 1.6)
			(drill 0.8)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pintype "passive")
		)
		(embedded_fonts no)
		(model "${KICAD9_3DMODEL_DIR}/Capacitor_THT.3dshapes/C_Disc_D3.0mm_W2.0mm_P2.50mm.step"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_THT:R_Axial_DIN0204_L3.6mm_D1.6mm_P1.90mm_Vertical"
		(layer "F.Cu")
		(at 145.75 74.75 180)
		(descr "Resistor, Axial_DIN0204 series, Axial, Vertical, pin pitch=1.9mm, 0.167W, length*diameter=3.6*1.6mm^2, http://cdn-reichelt.de/documents/datenblatt/B400/1_4W%23YAG.pdf")
		(tags "Resistor Axial_DIN0204 series Axial Vertical pin pitch 1.9mm 0.167W length 3.6mm diameter 1.6mm")
		(property "Reference" "R2"
			(at 1.19 -2 0)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "10kR"
			(at 0.95 1.92 0)
			(layer "F.Fab")
		)
		(property "Datasheet" "~"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" "Resistor"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "/")
		(sheetfile "PCB.kicad_sch")
		(attr through_hole)
		(pad "1" thru_hole circle
			(at 0 0 180)
			(size 1.4 1.4)
			(drill 0.7)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 11 "+3.3V")
			(pintype "passive")
		)
		(pad "2" thru_hole circle
			(at 1.9 0 180)
			(size 1.4 1.4)
			(drill 0.7)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 5 "/GP3")
			(pintype "passive")
		)
		(embedded_fonts no)
		(model "${KICAD9_3DMODEL_DIR}/Resistor_THT.3dshapes/R_Axial_DIN0204_L3.6mm_D1.6mm_P1.90mm_Vertical.step"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "rp2040:rp2040-zero"
		(layer "F.Cu")
		(at 161.82 62.28 90)
		(property "Reference" "RZ1"
			(at 10.16 -15.45 90)
			(layer "F.SilkS")
		)
		(property "Value" "RP2040-Zero"
			(at 10.16 -13.45 90)
			(layer "F.SilkS")
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(layer "F.Fab")
			(hide yes)
		)
		(sheetname "/")
		(sheetfile "PCB.kicad_sch")
		(attr through_hole)
		(fp_text user "${REFERENCE}"
			(at 10.16 -11.45 90)
			(unlocked yes)
			(layer "F.Fab")
		)
		(pad "1" thru_hole roundrect
			(at 17.78 -22.86 90)
			(size 2.6 1.6)
			(drill 0.8
				(offset 0.6 0)
			)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(roundrect_rratio 0.25)
			(net 4 "/GP0")
			(pinfunction "GP0")
			(pintype "bidirectional")
		)
		(pad "2" thru_hole roundrect
			(at 17.78 -20.32 90)
			(size 2.6 1.6)
			(drill 0.8
				(offset 0.6 0)
			)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(roundrect_rratio 0.25)
			(net 3 "/GP1")
			(pinfunction "GP1")
			(pintype "bidirectional")
		)
		(pad "3" thru_hole roundrect
			(at 17.78 -17.78 90)
			(size 2.6 1.6)
			(drill 0.8
				(offset 0.6 0)
			)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(roundrect_rratio 0.25)
			(net 6 "/GP2")
			(pinfunction "GP2")
			(pintype "bidirectional")
		)
		(pad "4" thru_hole roundrect
			(at 17.78 -15.24 90)
			(size 2.6 1.6)
			(drill 0.8
				(offset 0.6 0)
			)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(roundrect_rratio 0.25)
			(net 5 "/GP3")
			(pinfunction "GP3")
			(pintype "bidirectional")
		)
		(pad "5" thru_hole roundrect
			(at 17.78 -12.7 90)
			(size 2.6 1.6)
			(drill 0.8
				(offset 0.6 0)
			)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(roundrect_rratio 0.25)
			(net 7 "/GP4")
			(pinfunction "GP4")
			(pintype "bidirectional")
		)
		(pad "6" thru_hole roundrect
			(at 17.78 -10.16 90)
			(size 2.6 1.6002)
			(drill 0.8
				(offset 0.6 0)
			)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(roundrect_rratio 0.25)
			(net 8 "/GP5")
			(pinfunction "GP5")
			(pintype "bidirectional")
		)
		(pad "7" thru_hole roundrect
			(at 17.78 -7.62 90)
			(size 2.6 1.6002)
			(drill 0.8
				(offset 0.6 0)
			)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(roundrect_rratio 0.25)
			(net 10 "/GP6")
			(pinfunction "GP6")
			(pintype "bidirectional")
		)
		(pad "8" thru_hole roundrect
			(at 17.78 -5.08 90)
			(size 2.6 1.6002)
			(drill 0.8
				(offset 0.6 0)
			)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(roundrect_rratio 0.25)
			(net 9 "/GP7")
			(pinfunction "GP7")
			(pintype "bidirectional")
		)
		(pad "9" thru_hole roundrect
			(at 17.78 -2.54 90)
			(size 2.6 1.6002)
			(drill 0.8
				(offset 0.6 0)
			)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(roundrect_rratio 0.25)
			(net 22 "unconnected-(RZ1-GP8-Pad9)")
			(pinfunction "GP8")
			(pintype "bidirectional")
		)
		(pad "10" thru_hole roundrect
			(at 15.24 -2.33 90)
			(size 1.6 2.6)
			(drill 0.8
				(offset 0 0.6)
			)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(roundrect_rratio 0.25)
			(net 14 "unconnected-(RZ1-GP9-Pad10)")
			(pinfunction "GP9")
			(pintype "bidirectional")
		)
		(pad "11" thru_hole roundrect
			(at 12.7 -2.33 90)
			(size 1.5748 2.6)
			(drill 0.8
				(offset 0 0.6)
			)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(roundrect_rratio 0.25)
			(net 21 "unconnected-(RZ1-GP10-Pad11)")
			(pinfunction "GP10")
			(pintype "bidirectional")
		)
		(pad "12" thru_hole roundrect
			(at 10.16 -2.33 90)
			(size 1.5748 2.6)
			(drill 0.8
				(offset 0 0.6)
			)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(roundrect_rratio 0.25)
			(net 16 "unconnected-(RZ1-GP11-Pad12)")
			(pinfunction "GP11")
			(pintype "bidirectional")
		)
		(pad "13" thru_hole roundrect
			(at 7.62 -2.33 90)
			(size 1.5748 2.6)
			(drill 0.8
				(offset 0 0.6)
			)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(roundrect_rratio 0.25)
			(net 18 "unconnected-(RZ1-GP12-Pad13)")
			(pinfunction "GP12")
			(pintype "bidirectional")
		)
		(pad "14" thru_hole roundrect
			(at 5.08 -2.33 90)
			(size 1.5748 2.6)
			(drill 0.8
				(offset 0 0.6)
			)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(roundrect_rratio 0.25)
			(net 15 "unconnected-(RZ1-GP13-Pad14)")
			(pinfunction "GP13")
			(pintype "bidirectional")
		)
		(pad "15" thru_hole roundrect
			(at 2.54 -2.54 90)
			(size 2.6 1.6002)
			(drill 0.8
				(offset -0.6 0)
			)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(roundrect_rratio 0.25)
			(net 20 "unconnected-(RZ1-GP14-Pad15)")
			(pinfunction "GP14")
			(pintype "bidirectional")
		)
		(pad "16" thru_hole roundrect
			(at 2.54 -5.08 90)
			(size 2.6 1.6002)
			(drill 0.8
				(offset -0.6 0)
			)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(roundrect_rratio 0.25)
			(net 12 "unconnected-(RZ1-GP15-Pad16)")
			(pinfunction "GP15")
			(pintype "bidirectional")
		)
		(pad "17" thru_hole roundrect
			(at 2.54 -7.62 90)
			(size 2.6 1.6002)
			(drill 0.8
				(offset -0.6 0)
			)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(roundrect_rratio 0.25)
			(net 23 "unconnected-(RZ1-GP26-Pad17)")
			(pinfunction "GP26")
			(pintype "bidirectional")
		)
		(pad "18" thru_hole roundrect
			(at 2.54 -10.16 90)
			(size 2.6 1.6002)
			(drill 0.8
				(offset -0.6 0)
			)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(roundrect_rratio 0.25)
			(net 13 "unconnected-(RZ1-GP27-Pad18)")
			(pinfunction "GP27")
			(pintype "bidirectional")
		)
		(pad "19" thru_hole roundrect
			(at 2.54 -12.7 90)
			(size 2.6 1.6002)
			(drill 0.8
				(offset -0.6 0)
			)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(roundrect_rratio 0.25)
			(net 17 "unconnected-(RZ1-GP28-Pad19)")
			(pinfunction "GP28")
			(pintype "bidirectional")
		)
		(pad "20" thru_hole roundrect
			(at 2.54 -15.24 90)
			(size 2.6 1.6002)
			(drill 0.8
				(offset -0.6 0)
			)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(roundrect_rratio 0.25)
			(net 19 "unconnected-(RZ1-GP29-Pad20)")
			(pinfunction "GP29")
			(pintype "bidirectional")
		)
		(pad "21" thru_hole roundrect
			(at 2.54 -17.78 90)
			(size 2.6 1.6002)
			(drill 0.8
				(offset -0.6 0)
			)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(roundrect_rratio 0.25)
			(net 11 "+3.3V")
			(pinfunction "3V3")
			(pintype "power_in")
		)
		(pad "22" thru_hole roundrect
			(at 2.54 -20.32 90)
			(size 2.6 1.6002)
			(drill 0.8
				(offset -0.6 0)
			)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pinfunction "GND")
			(pintype "power_in")
		)
		(pad "23" thru_hole roundrect
			(at 2.54 -22.86 90)
			(size 2.6 1.6002)
			(drill 0.8
				(offset -0.6 0)
			)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(roundrect_rratio 0.25)
			(net 2 "+5V")
			(pinfunction "5V")
			(pintype "power_in")
		)
		(embedded_fonts no)
	)
	(footprint "MountingHole:MountingHole_2.7mm_M2.5"
		(layer "F.Cu")
		(at 160.6 98.4)
		(descr "Mounting Hole 2.7mm, M2.5, no annular, generated by kicad-footprint-generator mountinghole.py")
		(tags "mountinghole M2.5")
		(property "Reference" "REF**"
			(at 0 -3.65 0)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "MountingHole_2.7mm_M2.5"
			(at 0 3.65 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(attr exclude_from_pos_files exclude_from_bom)
		(pad "" np_thru_hole circle
			(at 0 0)
			(size 2.7 2.7)
			(drill 2.7)
			(layers "*.Cu" "*.Mask")
		)
		(embedded_fonts no)
	)
	(footprint "Resistor_THT:R_Axial_DIN0204_L3.6mm_D1.6mm_P1.90mm_Vertical"
		(layer "F.Cu")
		(at 161.655 74.56 180)
		(descr "Resistor, Axial_DIN0204 series, Axial, Vertical, pin pitch=1.9mm, 0.167W, length*diameter=3.6*1.6mm^2, http://cdn-reichelt.de/documents/datenblatt/B400/1_4W%23YAG.pdf")
		(tags "Resistor Axial_DIN0204 series Axial Vertical pin pitch 1.9mm 0.167W length 3.6mm diameter 1.6mm")
		(property "Reference" "R4"
			(at 0.95 -1.92 0)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "10kR"
			(at 0.95 1.92 0)
			(layer "F.Fab")
		)
		(property "Datasheet" "~"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" "Resistor"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "/")
		(sheetfile "PCB.kicad_sch")
		(attr through_hole)
		(pad "1" thru_hole circle
			(at 0 0 180)
			(size 1.4 1.4)
			(drill 0.7)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 11 "+3.3V")
			(pintype "passive")
		)
		(pad "2" thru_hole circle
			(at 1.9 0 180)
			(size 1.4 1.4)
			(drill 0.7)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 9 "/GP7")
			(pintype "passive")
		)
		(embedded_fonts no)
		(model "${KICAD9_3DMODEL_DIR}/Resistor_THT.3dshapes/R_Axial_DIN0204_L3.6mm_D1.6mm_P1.90mm_Vertical.step"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Connector_Molex:Molex_KK-254_AE-6410-04A_1x04_P2.54mm_Vertical"
		(layer "F.Cu")
		(at 136.27 85.56 -90)
		(descr "Molex KK-254 Interconnect System, old/engineering part number: AE-6410-04A example for new part number: 22-27-2041, 4 Pins (http://www.molex.com/pdm_docs/sd/022272021_sd.pdf), generated with kicad-footprint-generator")
		(tags "connector Molex KK-254 vertical")
		(property "Reference" "FAN0"
			(at -2.71 0 180)
			(layer "F.SilkS")
		)
		(property "Value" "Conn_01x04_Pin"
			(at 3.81 4.08 90)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "~"
			(at 0 0 90)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" "Generic connector, single row, 01x04, script generated"
			(at 0 0 90)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Connector*:*_1x??_*")
		(sheetname "/")
		(sheetfile "PCB.kicad_sch")
		(attr through_hole)
		(fp_text user "${REFERENCE}"
			(at 3.81 -2.22 90)
			(layer "F.Fab")
		)
		(pad "1" thru_hole roundrect
			(at 0 0 270)
			(size 1.74 2.19)
			(drill 1.19)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(roundrect_rratio 0.143678)
			(net 4 "/GP0")
			(pinfunction "Pin_1")
			(pintype "passive")
		)
		(pad "2" thru_hole oval
			(at 2.54 0 270)
			(size 1.74 2.19)
			(drill 1.19)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 3 "/GP1")
			(pinfunction "Pin_2")
			(pintype "passive")
		)
		(pad "3" thru_hole oval
			(at 5.08 0 270)
			(size 1.74 2.19)
			(drill 1.19)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 24 "VCC")
			(pinfunction "Pin_3")
			(pintype "passive")
		)
		(pad "4" thru_hole oval
			(at 7.62 0 270)
			(size 1.74 2.19)
			(drill 1.19)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "Pin_4")
			(pintype "passive")
		)
		(embedded_fonts no)
		(model "${KICAD9_3DMODEL_DIR}/Connector_Molex.3dshapes/Molex_KK-254_AE-6410-04A_1x04_P2.54mm_Vertical.step"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_THT:C_Disc_D3.0mm_W2.0mm_P2.50mm"
		(layer "F.Cu")
		(at 151.5 79)
		(descr "C, Disc series, Radial, pin pitch=2.50mm, diameter*width=3*2mm^2, Capacitor")
		(tags "C Disc series Radial pin pitch 2.50mm diameter 3mm width 2mm Capacitor")
		(property "Reference" "C3"
			(at 1.25 -2.25 0)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "100nF"
			(at 1.25 -2 0)
			(layer "F.Fab")
		)
		(property "Datasheet" "~"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" "Unpolarized capacitor"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "/")
		(sheetfile "PCB.kicad_sch")
		(attr through_hole)
		(fp_text user "${REFERENCE}"
			(at 1.25 0 0)
			(layer "F.Fab")
		)
		(pad "1" thru_hole circle
			(at 0 0)
			(size 1.6 1.6)
			(drill 0.8)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 24 "VCC")
			(pintype "passive")
		)
		(pad "2" thru_hole circle
			(at 2.5 0)
			(size 1.6 1.6)
			(drill 0.8)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pintype "passive")
		)
		(embedded_fonts no)
		(model "${KICAD9_3DMODEL_DIR}/Capacitor_THT.3dshapes/C_Disc_D3.0mm_W2.0mm_P2.50mm.step"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "PCM_SparkFun-Connector:ScrewTerminal_1x02_P3.5mm_Horizontal_Black"
		(layer "F.Cu")
		(at 160.25 68.25 90)
		(tags "SparkFun Screw Terminal")
		(property "Reference" "J1"
			(at 0 -1.5 90)
			(layer "F.Fab")
		)
		(property "Value" "Screw_Terminal_01x02"
			(at 0 2.2 90)
			(layer "F.Fab")
		)
		(property "Datasheet" "~"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" "Generic screw terminal, single row, 01x02, script generated (kicad-library-utils/schlib/autogen/connector/)"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "TerminalBlock*:*")
		(sheetname "/")
		(sheetfile "PCB.kicad_sch")
		(attr through_hole)
		(fp_text user "Wire Insert"
			(at 1.8 4.9 90)
			(layer "F.Fab")
		)
		(pad "1" thru_hole rect
			(at 0 0 90)
			(size 2.5 2.5)
			(drill 1.2)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 24 "VCC")
			(pinfunction "Pin_1")
			(pintype "passive")
			(thermal_bridge_angle 0)
		)
		(pad "2" thru_hole circle
			(at 3.5 0 90)
			(size 2.5 2.5)
			(drill 1.2)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "Pin_2")
			(pintype "passive")
		)
		(embedded_fonts no)
		(model "${KICAD9_3RD_PARTY}/3dmodels/com_github_sparkfun_SparkFun-KiCad-Libraries/Connector.3dshapes/Screw_Terminal_3.5mm_2P_Black.step"
			(offset
				(xyz 1.75 3.4 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz -90 -0 -0)
			)
		)
	)
	(footprint "Resistor_THT:R_Axial_DIN0204_L3.6mm_D1.6mm_P1.90mm_Vertical"
		(layer "F.Cu")
		(at 137.505 74.8 180)
		(descr "Resistor, Axial_DIN0204 series, Axial, Vertical, pin pitch=1.9mm, 0.167W, length*diameter=3.6*1.6mm^2, http://cdn-reichelt.de/documents/datenblatt/B400/1_4W%23YAG.pdf")
		(tags "Resistor Axial_DIN0204 series Axial Vertical pin pitch 1.9mm 0.167W length 3.6mm diameter 1.6mm")
		(property "Reference" "R1"
			(at 0.905 -2 0)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "10kR"
			(at 0.95 1.92 0)
			(layer "F.Fab")
		)
		(property "Datasheet" "~"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" "Resistor"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "/")
		(sheetfile "PCB.kicad_sch")
		(attr through_hole)
		(pad "1" thru_hole circle
			(at 0 0 180)
			(size 1.4 1.4)
			(drill 0.7)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 11 "+3.3V")
			(pintype "passive")
		)
		(pad "2" thru_hole circle
			(at 1.9 0 180)
			(size 1.4 1.4)
			(drill 0.7)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 3 "/GP1")
			(pintype "passive")
		)
		(embedded_fonts no)
		(model "${KICAD9_3DMODEL_DIR}/Resistor_THT.3dshapes/R_Axial_DIN0204_L3.6mm_D1.6mm_P1.90mm_Vertical.step"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_THT:C_Disc_D3.0mm_W2.0mm_P2.50mm"
		(layer "F.Cu")
		(at 135.27 79.06)
		(descr "C, Disc series, Radial, pin pitch=2.50mm, diameter*width=3*2mm^2, Capacitor")
		(tags "C Disc series Radial pin pitch 2.50mm diameter 3mm width 2mm Capacitor")
		(property "Reference" "C1"
			(at 1.25 -2.25 0)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "100nF"
			(at 1.25 -2.06 0)
			(layer "F.Fab")
		)
		(property "Datasheet" "~"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" "Unpolarized capacitor"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "/")
		(sheetfile "PCB.kicad_sch")
		(attr through_hole)
		(fp_text user "${REFERENCE}"
			(at 1.25 0 0)
			(layer "F.Fab")
		)
		(pad "1" thru_hole circle
			(at 0 0)
			(size 1.6 1.6)
			(drill 0.8)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 24 "VCC")
			(pintype "passive")
		)
		(pad "2" thru_hole circle
			(at 2.5 0)
			(size 1.6 1.6)
			(drill 0.8)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pintype "passive")
		)
		(embedded_fonts no)
		(model "${KICAD9_3DMODEL_DIR}/Capacitor_THT.3dshapes/C_Disc_D3.0mm_W2.0mm_P2.50mm.step"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Connector_PinHeader_2.54mm:PinHeader_1x02_P2.54mm_Vertical"
		(layer "F.Cu")
		(at 144 67.775 180)
		(descr "Through hole straight pin header, 1x02, 2.54mm pitch, single row")
		(tags "Through hole pin header THT 1x02 2.54mm single row")
		(property "Reference" "JP1"
			(at 0 -2.38 0)
			(layer "F.SilkS")
		)
		(property "Value" "Jumper_2_Open"
			(at 0 4.92 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "~"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" "Jumper, 2-pole, open"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Jumper* TestPoint*2Pads* TestPoint*Bridge*")
		(sheetname "/")
		(sheetfile "PCB.kicad_sch")
		(attr through_hole)
		(fp_text user "${REFERENCE}"
			(at 0 1.27 90)
			(layer "F.Fab")
		)
		(pad "1" thru_hole rect
			(at 0 0 180)
			(size 1.7 1.7)
			(drill 1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 24 "VCC")
			(pinfunction "A")
			(pintype "passive")
		)
		(pad "2" thru_hole circle
			(at 0 2.54 180)
			(size 1.7 1.7)
			(drill 1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 2 "+5V")
			(pinfunction "B")
			(pintype "passive")
		)
		(embedded_fonts no)
		(model "${KICAD9_3DMODEL_DIR}/Connector_PinHeader_2.54mm.3dshapes/PinHeader_1x02_P2.54mm_Vertical.step"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_THT:C_Disc_D3.0mm_W2.0mm_P2.50mm"
		(layer "F.Cu")
		(at 159.52 78.81)
		(descr "C, Disc series, Radial, pin pitch=2.50mm, diameter*width=3*2mm^2, Capacitor")
		(tags "C Disc series Radial pin pitch 2.50mm diameter 3mm width 2mm Capacitor")
		(property "Reference" "C4"
			(at 1.25 -2.25 0)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "100nF"
			(at 1.25 -2.01 0)
			(layer "F.Fab")
		)
		(property "Datasheet" "~"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" "Unpolarized capacitor"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "/")
		(sheetfile "PCB.kicad_sch")
		(attr through_hole)
		(fp_text user "${REFERENCE}"
			(at 1.25 0 0)
			(layer "F.Fab")
		)
		(pad "1" thru_hole circle
			(at 0 0)
			(size 1.6 1.6)
			(drill 0.8)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 24 "VCC")
			(pintype "passive")
		)
		(pad "2" thru_hole circle
			(at 2.5 0)
			(size 1.6 1.6)
			(drill 0.8)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pintype "passive")
		)
		(embedded_fonts no)
		(model "${KICAD9_3DMODEL_DIR}/Capacitor_THT.3dshapes/C_Disc_D3.0mm_W2.0mm_P2.50mm.step"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_THT:CP_Radial_D7.5mm_P2.50mm"
		(layer "F.Cu")
		(at 150.5 67.661395 90)
		(descr "CP, Radial series, Radial, pin pitch=2.50mm, diameter=7.5mm, height=8mm, Electrolytic Capacitor")
		(tags "CP Radial series Radial pin pitch 2.50mm diameter 7.5mm height 8mm Electrolytic Capacitor")
		(property "Reference" "C5"
			(at 1.25 -5 90)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "100uF"
			(at 1.361395 5.1 90)
			(layer "F.Fab")
		)
		(property "Datasheet" "~"
			(at 0 0 90)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" "Polarized capacitor"
			(at 0 0 90)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "CP_*")
		(sheetname "/")
		(sheetfile "PCB.kicad_sch")
		(attr through_hole)
		(fp_text user "${REFERENCE}"
			(at 1.25 0 90)
			(layer "F.Fab")
		)
		(pad "1" thru_hole roundrect
			(at 0 0 90)
			(size 1.6 1.6)
			(drill 0.8)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(roundrect_rratio 0.15625)
			(net 24 "VCC")
			(pintype "passive")
		)
		(pad "2" thru_hole circle
			(at 2.5 0 90)
			(size 1.6 1.6)
			(drill 0.8)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pintype "passive")
		)
		(embedded_fonts no)
		(model "${KICAD9_3DMODEL_DIR}/Capacitor_THT.3dshapes/CP_Radial_D7.5mm_P2.50mm.step"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Connector_Molex:Molex_KK-254_AE-6410-04A_1x04_P2.54mm_Vertical"
		(layer "F.Cu")
		(at 144.52 85.52 -90)
		(descr "Molex KK-254 Interconnect System, old/engineering part number: AE-6410-04A example for new part number: 22-27-2041, 4 Pins (http://www.molex.com/pdm_docs/sd/022272021_sd.pdf), generated with kicad-footprint-generator")
		(tags "connector Molex KK-254 vertical")
		(property "Reference" "FAN1"
			(at -2.63 0 180)
			(layer "F.SilkS")
		)
		(property "Value" "Conn_01x04_Pin"
			(at 3.81 4.08 90)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "~"
			(at 0 0 90)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" "Generic connector, single row, 01x04, script generated"
			(at 0 0 90)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Connector*:*_1x??_*")
		(sheetname "/")
		(sheetfile "PCB.kicad_sch")
		(attr through_hole)
		(fp_text user "${REFERENCE}"
			(at 3.81 -2.22 90)
			(layer "F.Fab")
		)
		(pad "1" thru_hole roundrect
			(at 0 0 270)
			(size 1.74 2.19)
			(drill 1.19)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(roundrect_rratio 0.143678)
			(net 6 "/GP2")
			(pinfunction "Pin_1")
			(pintype "passive")
		)
		(pad "2" thru_hole oval
			(at 2.54 0 270)
			(size 1.74 2.19)
			(drill 1.19)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 5 "/GP3")
			(pinfunction "Pin_2")
			(pintype "passive")
		)
		(pad "3" thru_hole oval
			(at 5.08 0 270)
			(size 1.74 2.19)
			(drill 1.19)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 24 "VCC")
			(pinfunction "Pin_3")
			(pintype "passive")
		)
		(pad "4" thru_hole oval
			(at 7.62 0 270)
			(size 1.74 2.19)
			(drill 1.19)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "Pin_4")
			(pintype "passive")
		)
		(embedded_fonts no)
		(model "${KICAD9_3DMODEL_DIR}/Connector_Molex.3dshapes/Molex_KK-254_AE-6410-04A_1x04_P2.54mm_Vertical.step"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "MountingHole:MountingHole_2.7mm_M2.5"
		(layer "F.Cu")
		(at 160.6 39.4)
		(descr "Mounting Hole 2.7mm, M2.5, no annular, generated by kicad-footprint-generator mountinghole.py")
		(tags "mountinghole M2.5")
		(property "Reference" "REF**"
			(at 0 -3.65 0)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "MountingHole_2.7mm_M2.5"
			(at 0 3.65 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(attr exclude_from_pos_files exclude_from_bom)
		(pad "" np_thru_hole circle
			(at 0 0)
			(size 2.7 2.7)
			(drill 2.7)
			(layers "*.Cu" "*.Mask")
		)
		(embedded_fonts no)
	)
	(gr_rect
		(start 132.8 36)
		(end 164 102)
		(fill no)
		(layer "Edge.Cuts")
	)
	(gr_text "harton.dev"
		(at 144.4 39.8 0)
		(layer "F.SilkS")
	)
	(gr_text "P"
		(at 139.8 86.2 0)
		(layer "F.SilkS")
	)
	(gr_text "P"
		(at 156 86.2 0)
		(layer "F.SilkS")
	)
	(gr_text "+"
		(at 147.8 91.2 0)
		(layer "F.SilkS")
	)
	(gr_text "G"
		(at 148 93.8 0)
		(layer "F.SilkS")
	)
	(gr_text "T"
		(at 148 88.6 0)
		(layer "F.SilkS")
	)
	(gr_text "G"
		(at 139.8 93.8 0)
		(layer "F.SilkS")
	)
	(gr_text "RPZ Fan Control"
		(at 141.8 38.2 0)
		(layer "F.SilkS")
	)
	(gr_text "P"
		(at 148 86.2 0)
		(layer "F.SilkS")
	)
	(gr_text "G"
		(at 156 93.8 0)
		(layer "F.SilkS")
	)
	(gr_text "+"
		(at 155.8 91.2 0)
		(layer "F.SilkS")
	)
	(gr_text "T"
		(at 139.8 88.6 0)
		(layer "F.SilkS")
	)
	(gr_text "T"
		(at 156 88.6 0)
		(layer "F.SilkS")
	)
	(gr_text "+"
		(at 139.6 91.2 0)
		(layer "F.SilkS")
	)
	(zone
		(net 1)
		(net_name "GND")
		(layer "B.Cu")
		(hatch edge 0.5)
		(connect_pads
			(clearance 0.5)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
		)
		(polygon
			(pts
				(xy 164 36) (xy 132.8 36) (xy 132.8 102) (xy 164 102)
			)
		)
	)
	(embedded_fonts no)
)
